<template>
  <div class="remote-ui">
    <!--    调试对象-->
    <DrawPanneImageUpload />
  </div>
</template>
<script lang="ts" setup>
import {
  GlobalInjectKeyConst,
  type GlobalInjectMaterials,
} from "~/types/common";
import { MockMaterials } from "~/composables/mock/material.data";

const materialData = ref(MockMaterials);
/**
 * EasyAI平台，已全局注入素材库库信息这里，使用mock数据用于调试
 */
provide<GlobalInjectMaterials>(GlobalInjectKeyConst.AllMaterials, {
  materials: materialData,
  refreshMaterials: async () => [],
});
</script>
